Copyright: Copyright © 1995-1996 Hercules Computer Technology, Inc.


Touch 95 im Überblick

Was ist Hercules Touch 95?

Willkommen!

Hercules Touch 95™ ist die neueste Generation unserer Dienstprogramme für Windows 95 Anwender. Ganz neu für Windows 95 ist, daß Hercules Touch 95 mit seinen „Karteikarten“ genau so funktioniert, wie die „Eigenschaften für Anzeige“ Dialogbox, mit der Sie unter Windows 95 z. B. Auflösung und Farbtiefe einstellen. Sie können also für die Grundeinstellungen sowohl die „Eigenschaften für Anzeige“ Dialogbox als auch Hercules Touch 95 verwenden. Hercules Touch 95 bietet Ihnen jedoch viele zusätzliche Funktionen, die bei Windows 95 nicht enthalten sind.

Genauso wie bei Windows 95 sind auch alle Funktionen von Hercules Touch 95 auf einer Anzahl von „Karteikarten“ dargestellt. Dadurch wird die Organisation der einzelnen Funktionen und Informationen viel effizienter. Und Hercules kann in Zukunft Karteikarten mit weiteren Funktionen hinzuzufügen, ohne die bereits existierende Software zu verändern.

Verwenden Sie das unten stehende Menü oder klicken Sie auf die Schaltfläche Inhalt, um mehr über die einzelnen Funktionen von Hercules Touch 95 zu erfahren. Wenn Sie Fragen oder Vorschläge haben, informieren Sie uns bitte. Sie können unsere komplette Anschrift lesen, indem sie die Support Schaltfläche wählen.

Installieren und entfernen von Hercules Touch 95 beschreibt wie man Hercules Touch 95 installiert und wieder vom System entfernt. Wenn Sie Ihre Hercules Grafikkarte auf einem anderen PC installieren möchten und vielleicht kein Manual zur Hand haben, wird Ihnen dieser Abschnitt helfen.

Mit Konfigurieren der Anzeige stellt man die Auflösung, den Bildausschnitt, die Farbtiefe und die Schriftart ein.

Mit Bildjustage stellt man mit einigen Mausklicks Bildlage und Bildgröße auf dem Monitor ein.

Mit dem Bildfrequenz Zähler messen und überprüfen Sie Ihre aktuelle Bildfrequenz. Sollte die Bildfrequenz z. B. niedriger sein, als es Ihr Monitor und die Hercules Grafikkarte gemeinsam zulassen, können Sie nach Wechseln der Einstellungen (z. B. durch Erhöhen der Bildfrequenz) erneut nachmessen.

Mit Speedy starten Sie einen der härtesten Multitasking-Grafikkarten-Tests, den es bislang gegeben hat.

Mit der Zoom In Karteikarte stellen Sie die Parameter für die „Lupe“ ein, ein Fenster, in dem ein beliebig großer Ausschnitt des Bildschirms in bis zu 8-facher Vergrößerung dargestellt wird.

Mit Support erfahren Sie, wie Sie uns am besten Erreichen, beispielsweise wenn Sie technische Unterstützung benötigen. Sollten Sie einen World Wide Web Browser auf Ihrem Computer installiert haben (Internet), können Sie sich auch unsere Internet Services „off-line“ ansehen, die sich in der Datei DEFAULT.HTM im HERCULES-Verzeichnis befinden. Dadurch wird keine Telefon-Verbindungszeit beansprucht.


Installieren und Entfernen von Hercules Touch 95

Ihre Hercules Grafikkarte wurde mit einer CD und einer oder mehreren Windows 95 Disketten ausgeliefert. Auf der CD oder der ersten Diskette befindet sich das Programm SETUP.EXE, mit dem man Hercules Touch 95 und das Hercules Entertainment Center installiert. Abhängig von Ihrer Grafikkarte installiert SETUP.EXE gegebenenfalls auch die Treiber Ihrer Hercules Grafikkarte.

SETUP.EXE verwendet die intelligente „Wizzard“-Oberfläche, mit der Sie Ihre Installation ganz individuell durchzuführen. So können Sie alle, einzelne oder jede Kombination von Treibern und Windows 95 Dienstprogrammen installieren.

Alle Hercules Dienstprogramme können mit dem Hinzufügen/Entfernen Programm Symbol in der Systemsteuerung entfernt werden. Wählen Sie hierfür einfach „Hercules Dienstprogramme“ in der Liste der installierten Software aus. Windows 95 macht den Rest.


Konfigurieren der Anzeige

Mit den Funktionen dieser Karteikarte stellen Sie die Auflösung, den sichtbaren Bildausschnitt auf Ihrem Bildschirm, den so genannten Virtual Desktop, sowie  Farbtiefe, Bildfrequenz und die Schriftart ein. Sie konfigurieren auch die Eigenschaften des Bildausschnitts, und Sie bestimmen einen Hotkey, um Hercules Touch 95 zu starten.

Die Karteikarte „Konfiguration der Anzeige“ enthält viele Funktionen der „Eigenschaften für Anzeige“ Dialogbox von Windows 95. Sie können sowohl Hercules Touch 95 als auch die „Eigenschaften für Anzeige“ Dialogbox verwenden. Beide Programme führen zum Ziel und verursachen keinerlei Konflikte.

Wenn Sie mehr über die Funktionen zur Konfiguration der Anzeige erfahren wollen, dann klicken Sie bitte auf die entsprechenden Bereiche der unten abgebildeten Darstellung.


Wechseln der Auflösung

Mit dieser Auswahl stellen Sie die Anzahl der horizontalen und vertikalen Bildpunkte Ihrer Auflösung ein.

Die angezeigte Auswahl der Auflösung hängt von Ihrer Hercules Grafikkarte und dem von Ihnen verwendeten Monitor ab, den Sie in der „Eigenschaften für Anzeige“ Dialogbox ausgewählt haben. Wenn Sie z. B. Windows 95 mitgeteilt haben, daß Ihr Monitor die Auflösung 1280x1024 nicht unterstützt, so ist diese Auswahl auch mit Hercules Touch 95 nicht möglich. Wenn Ihnen von Hercules Touch 95 nicht alle Auflösungen angezeigt werden, von denen Sie glauben, daß sie möglich sind, sollten Sie die Wahl Ihres Monitors überprüfen.

Der Bildausschnitt, der auf Ihrem Monitor angezeigt wird, kann die volle Auflösung sein oder ein Teil davon sein. So kann Ihre Auflösung z. B. 1280x1024 Bildpunkte betragen, für Ihren Monitor können Sie z. B. zwischen einen Bildausschnitt von 1024x768, 800x600 oder 640x480 wählen (Virtual Desktop). Nähere Informationen finden Sie im Abschnitt Einstellung von Auflösung und Bildausschnitt.


 Wechseln des Bildausschnitts

Mit dieser Funktion wählen Sie den auf Ihrem Monitor als Teil der gesamten Auflösung angezeigten Bildausschnitt ( Virtual Desktop ). Sie können mit der Bildausschnitt Einstellung, einer Funktion des Konfiguration der Anzeige Karteiblatts auch die Eigenschaften wählen, wie der Bildausschnitt dargestellt werden soll. Die mögliche Auswahl hängt von Ihrer Hercules Grafikkarte ab.

Der Bildausschnitt, der auf Ihrem Monitor angezeigt wird, kann die volle Auflösung oder einen Teil davon betragen. Nähere Informationen finden Sie im Abschnitt Einstellen von Auflösung und Bildausschnitt.


Einstellen des Bildausschnitt

Diese Funktion konfiguriert die Eigenschaften des Bildausschnitts und ist nur aktiv, falls der Bildausschnitt kleiner ist als die Auflösung.

Wenn Sie „Pop-Up zentrieren“ aktivieren, werden Pop-Up Dialogboxen immer in der Mitte Ihres Bildausschnitts erscheinen, z. B., um Sie vor Verlassen einer Anwendung vor Datenverlust zu warnen. Ist diese Einstellung nicht aktiviert, erscheinen Pop-Up Dialogboxen in der Mitte der gesamten Auflösung. Das kann z. B. auch bedeuten, daß diese Dialogboxen auf dem von Ihnen gewählten Bildausschnitt nicht sichtbar sind, falls Sie sich mit Ihrem Bildausschnitt weit genug von der Mitte der gesamten Auflösung entfernt haben. In diesen Fall müssen Sie den Bildausschnitt mit der Maus so lange verschieben (Panning) bis Sie in die Nähe des Mittelpunkts gelangen.

Mit „Pan Lock“ fixieren Sie den Bildausschnitt und vermeiden eine Verschiebung des Bildausschnitts, wenn Sie mit der Maus an den Randbereich Ihres Monitors gelangen. Pan Lock kann durch einen Hot Key aktiviert und deaktiviert werden. Hot Keys werden in der Dialogbox Hot Keys... definiert.


Hot Keys...

Mit dieser Funktion starten Sie die Dialogbox zur Definition der Hot Keys. Zu weiteren Informationen klicken Sie bitte auf die untenstehende Abbildung.


Pan Lock Hot Key

Mit dieser Funktion definieren Sie die Hot Key-Belegung, um Pan Lock ein- und auszuschalten. Durch Markierung der Shift, Ctrl und/oder Alt Boxen können Sie Mehrfach-Tastenkombinationen definieren, die von Ihren Anwendungen nicht verwendet werden.

Ist Pan Lock aktiviert, dann fixieren Sie den Bildausschnitt auf Ihrem Monitor und vermeiden eine Verschiebung des Bildausschnitts wenn Sie mit der Maus an den Randbereich Ihres Monitors gelangen.


Touch 95 Icon

Mit dieser Funktion können Sie ein Icon zum Starten von Touch 95 auf dem Windows Taskbar in der Nähe der Uhren-Anzeige plazieren. Auf diese Weise können Sie Touch 95 durch Anklicken jederzeit starten.


Zoom In

Mit der „Zoom In“ Karteikarte werden die Parameter der „Lupe“ definiert. Die „Lupe“ ist ein Fenster, in dem ein beliebig großer Ausschnitt des Bildschirms in bis zu 8-facher Vergrößerung dargestellt wird. Wenn Sie den Mauszeiger bewegen, wird der Bildschirmbereich die unmittelbare Umgebung im „Zoom In“-Fenster vergrößert dargestellt.

Das „Zoom In“-Fenster kann beliebig skaliert und an beliebiger Stelle auf dem Bildschirm positioniert werden.

„Zoom In“ ist eine von Touch 95 unabhängige Funktion. Nach dem Starten von „Zoom In“ können Sie Touch 95 schließen.

„Zoom In“ wird wie folgt konfiguriert. Entweder Sie klicken auf die Schaltfläche „Konfigurieren“ auf der „Zoom In“ Karteikarte von Touch 95, um Ihre Parameter festzulegen, die nach Verlassen von Touch 95 automatisch gespeichert werden. Oder Sie wählen Ihre Optionen „on the fly“ im „Zoom In“-Menü.

Die „Zoom In“ Optionen enthalten folgende Funktionen:

Mit dem Hot Key starten Sie das „Zoom In“ Fenster, nachdem Sie es durch Anklicken minimiert haben. Diese Funktion hilft Ihnen während einer Anwendung bei der Sie die „Lupe“ von Zeit zu Zeit aber nicht permanent benötigen.

Der Zoomfaktor ist der Vergrößerungsfaktor. Sie können einen Vergrößerungsfaktor zwischen 1x und 8x wählen. Im Falle von 1x wird ein nicht vergrößerter Ausschnitt um den Mauszeiger angezeigt, im Falle von 8x ist der Ausschnitt 8-fach vergrößert.

Mit dem Fadenkreuz wird die Lage des Mauszeigers in der Lupe exakt angezeigt. Diese Funktion hilft Ihnen bei pixel-genauen Anwendungen, z. B. bei Bildverarbeitung, Layout oder technischen Zeichnungen. Mit „Nein“ wird das Fadenkreuz ausgeschaltet.

Mit Panning legen Sie fest, wie der Bildausschnitt in der Lupe dem Mauszeiger folgt. Wählen Sie Kontinuierlich Pannen, folgt das Zentrum des Ausschnitt in der Lupe permanent der Bewegung des Mauszeigers, z. B. zum Auffinden eines Bildausschnitts. Wählen Sie Rand Pannen, wird das Zoom Fenster erst dann weiter bewegt, wenn Sie mit dem Mauszeiger den angezeigten Bereich verlassen. Diese Funktion unterstützt Anwendungen bei denen innerhalb des angezeigten Bereichs gearbeitet wird, z. B. bei der Bildmanipulation oder bei technischen Zeichnungen.


Hercules Touch 95 Hot Key

Mit dieser Funktion definieren Sie die Hot Key-Belegung, um Hercules Touch 95 zu starten. Durch Markierung der Shift, Ctrl und/oder Alt Boxen können Sie Mehrfach-Tastenkombinationen definieren, die von Ihren Anwendungen nicht verwendet werden.

Dieser Hot Key kann natürlich nur solange funktionieren, wie Hercules Touch 95 auch wirklich auf Ihrem Computer installiert ist.


OK

Wenn Sie die Schaltfläche „OK“ anklicken, dann bestätigen und aktivieren Sie Ihre Einstellungen in einer Dialogbox.


Abbrechen

Wenn Sie die Schaltfläche „Abbrechen“ anklicken, dann werden alle Eingaben ignoriert, und Sie verlassen die Dialogbox.


Hilfe

Wenn Sie „Hilfe“ anklicken, dann starten Sie ein Fenster mit der Bedienungsanleitung für die angezeigten Funktionen. Im Hercules Touch 95 Hauptmenu wird Ihnen ein Inhaltsverzeichnis angezeigt, von dem aus Sie zu den einzelnen Inhalten springen können.


Wechseln der Bildfrequenz

Mit dieser Funktion wählen Sie die Bildfrequenz für Ihre Bildschirm-Darstellung. Die zur Auswahl stehenden Bildfrequenzen zwischen 60 Hz und 150 Hz hängen von verschiedenen Faktoren ab. Von ihrer Hercules Grafikkarte, der Auflösung, dem Bildausschnitt und der Farbtiefe.

Für jede Kombination von Auflösung, Farbtiefe und Bildausschnitt benötigt Hercules Touch 95 jeweils eine Bildfrequenz, die Ihr Monitor darstellen kann. Dementsprechend wird die von Ihnen eingestellte Bildfrequenz immer zusammen mit Auflösung, Farbtiefe und Bildausschnitt gespeichert. Haben Sie eine Bildfrequenz ausgewählt, so wird diese Bildfrequenz zusammen mit der entsprechenden Kombination Auflösung/Farbtiefe/Bildausschnitt solange verwendet, bis Sie eine andere Bildfrequenz bestimmen. Insbesondere bleiben Ihre Einstellungen auch dann erhalten, wenn Sie booten oder Windows 95 herunterfahren. Die Bildfrequenz muß beim Start von Windows 95 nicht erneut eingegeben werden.

Falls Sie sich für die Option „Auto“ entscheiden, wird Windows 95 die jeweilige Bildfrequenz für den Monitor verwenden, den Sie in der Windows 95 Dialogbox Eigenschaften für Anzeige gewählt haben.

Achtung: In den meisten Fällen ist „Auto“ die beste Wahl. Die Monitore sind bei Windows 95 jedoch nicht vollständig gelistet. In einigen Fällen sind die in Windows 95 gespeicherten Parameter nicht korrekt und Ihr Monitor kann z. B. höhere Bildfrequenzen darstellen. In beiden Fällen können Sie mit der Funktion „Wechseln der Bildfrequenz“ die vorgegebenen Parameter überschreiben. Es ist jedoch auch möglich, daß Sie mit dieser Funktion eine Bildfrequenz wählen, die oberhalb Ihrer Monitor-Spezifikationen liegt. Nachdem Sie sich für eine Bildfrequenz entschieden haben und diese durch „OK“ oder „Übernehmen“ bestätigen, wird Ihnen für 10 Sekunden ein „Testbild“ mit der neuen Bildfrequenz angezeigt. Sollte irgend etwas nicht in Ordnung sein, können Sie auf die ursprüngliche Bildfrequenz zurückschalten. Es besteht jedoch immer die Möglichkeit, daß Ihr Monitor Schaden nimmt, wenn Sie sich für eine Bildfrequenz entscheiden, die zwar Ihre Hercules Grafikkarte jedoch nicht Ihr Monitor darstellen kann. Im Zweifelsfall sollten Sie unbedingt die Dokumentation zu Ihrem Monitor lesen.


Wechseln der Farbtiefe

Mit dieser Funktion wählen Sie die Anzahl der gleichzeitig darstellbaren Farben. Für eine größere Farbtiefe (mehr Farben) benötigen Sie mehr Bildspeicher. Dadurch ist die maximale Auflösung bei größeren Farbtiefen (65.000 oder 16,7 Millionen Farben) häufig geringer als bei geringer Farbtiefe (16 oder 256 Farben). Wenn Sie also die Farbtiefe verändern, dann ändert sich häufig auch die Auswahl von Auflösung und Bildausschnitt.

Eine größere Farbtiefe kann auch zu einer etwas geringeren Darstellungsgeschwindigkeit führen, da ein Vielfaches an Daten verarbeitet werden muß. Wählen Sie deshalb die Kombination von Auflösung, Farbtiefe, Bildausschnitt, die sich für Ihre Anwendung am besten eignet.


Einstellen von Auflösung und Bildausschnitt

Mit Hercules Touch 95 können Sie die Größe eines Bildausschnitts definieren, der auf Ihrem Monitor als Teil der gesamten Auflösung dargestellt wird (Virtual Desktop). Wenn Sie z. B. eine Auflösung von 1280x1024 einstellen und als Bildausschnitt 640x480 wählen, wird Ihnen nur dieser Bildausschnitt auf dem Monitor angezeigt. Wenn Sie mir dem Mauscursor an den Randbereich Ihres Monitors kommen, wir der Bildausschnitt entsprechend verschoben (Pan).

Sie aktivieren einen Bildausschnitt mit den Funktionen der Karteikarte Konfigurieren der Anzeige. Hercules Touch 95 bietet zwei zusätzliche Funktionen.

Wenn Sie Pop-Up zentrieren aktivieren, werden Pop-Up Dialogboxen immer in der Mitte Ihres Bildausschnitts erscheinen, z. B., um Sie vor Verlassen einer Anwendung vor Datenverlust zu warnen. Ist diese Einstellung nicht aktiviert, erscheinen Pop-Up Dialogboxen in der Mitte der gesamten Auflösung. Das kann z. B: auch bedeuten, daß diese Dialogboxen auf dem von Ihnen gewählten Bildausschnitt nicht sichtbar sind, falls Sie sich mit Ihrem Bildausschnitt weit genug von der Mitte der gesamten Auflösung entfernt haben. In diesen Fall müssen Sie den Bildausschnitt mit der Maus so lange verschieben, (Panning) bis Sie in die Nähe des Mittelpunkts gelangen.

Mit aktiviertem Pan Lock wird der Bildausschnitt fixiert und nicht verschoben, wenn sich der Mauscursor im Randbereich des Monitors befindet. Beide Funktionen befinden sich im Menü Konfigurieren der Anzeige.

Die Vorteile eines Bildausschnitts

Die Einstellung eines Bildausschnitts als Teil der gesamten Auflösung bietet viele Vorteile. Desktop Publishing-Anwendungen sollten z. B. hauptsächlich in „Doppelseitendarstellung“ mit 1280x1024 Bildpunkten angezeigt werden. Mit kleineren oder preiswerteren Monitoren sind 1280x1024 Bildpunkte jedoch allgemein nicht ergonomisch darstellbar, so daß mit geringeren Auflösungen gearbeitet wird. Bei geringeren Auflösungen muß jedoch häufig die ZOOM-Funktion der Software genutzt werden, um Details genügend exakt erkennen zu können. Hier bietet die Wahl eines Bildausschnitts eine zeitsparende Alternative, bei der häufig auch mit höheren Bildfrequenzen gearbeitet werden kann.

Wählen Sie eine Auflösung von 1280x1024 (Ihre Hercules Grafikkarte benötigt 2 MB Bildspeicher) und lassen Sie sich z. B. mit einem preiswerteren 15“ Monitor (z. B. 57 kHz) aber „nur“ einen Ausschnitt von 800x600 Bildpunkten mit ergonomischen 90 Hz anzeigen. Jetzt können Sie auch ohne Zeitverzögerung über die gesamte Auflösung Pannen, ohne auf die ZOOM-Funktion Ihrer Applikations-Software angewiesen zu sein, die häufig erheblich langsamer arbeitet.

Die maximal mögliche Farbtiefe richtet sich jedoch nicht nach der Größe Ihres Bildausschnitts sondern immer nach der gewählten Auflösung.

Bei einer Grafikkarte mit 2 MB Bildspeicher können Sie z. B. mit Auflösungen bis 1280x1024 Bildpunkten bei 75 Hz arbeiten. Dies setzt jedoch einen Monitor mit bis zu mindestens 78 kHz Zeilenfrequenz voraus. Bei der Wahl eines Bildausschnitts werden jedoch wahlweise nur 1024x768, 800x600 oder  640x480 Bildpunkte angezeigt, und es reicht ein preiswerterer Monitor aus.

Mit 2 MB Bildspeicher können maximal 800x600 Bildpunkte in True Color angezeigt werden. Einige Grafikkarten von Hercules sind bei dieser Auflösung auf eine Bildfrequenz von 75 Hz begrenzt. Bei der Wahl eines Bildausschnitts von 640x480 Bildpunkten sind jedoch z. T. auch Bildfrequenzen bis 90 Hz möglich.


Support

Diese „Karteikarte“ enthält genaue Informationen, wie Sie Hercules erreichen. Wählen Sie hier klicken oder die „Support“ Schaltfläche oben, um die Information zu lesen.

Besitzen Sie einen „World Wide Web Browser“, dann starten Sie diesen mit „hier klicken“. Sie sehen nun die Inhalte der Serviceangebote unserer „ World Wide Web Site“. Wir verbinden Sie nicht automatisch „on-line“, sondern Sie erhalten einen kostenlosen Eindruck aller von uns angebotenen Internet-Dienste. Wenn Sie sich jedoch für einen oder mehrere unserer Links entscheiden, dann werden Sie automatisch mit unseren Internet-Seiten verbunden. In diesem Fall sollten Sie, falls erforderlich, zunächst eine Verbindung aufbauen.

Die „hier klicken“ Schaltfläche startet die Applikation, die mit der *.HTM Erweiterung verbunden ist. Sollte Ihr „WWW Browser“ nicht mit dieser Datei-Erweiterung im Windows 95 Register eingetragen sein, können Sie sich die Inhalte auch ansehen, indem Sie den Browser manuell starten und die DEFAULT.HTM Datei im Hercules-Verzeichnis öffnen.


Wie Sie Hercules erreichen

USA

Hercules Computer Technology, Inc.

3839 Spinnaker Court

Fremont, CA 94538

USA

Hercules	+1-510-623-6030

Technischer Support	+1-800-323-0601

+1-510-623-6050

Fax-Back Service	+1-800-711-HERC

Vertriebshotline	+1-800-532-0600

Fax	+1-510-623-1112

BBS	+1-510-623-7449 (analog)

Europa

Hercules Computer Technology, Inc.

Bussardstr. 5

D-82166 Gräfelfing

München

Hercules	+49-89-8989-0228

Technischer Support	+49-89-8989-0573

Fax	+49-89-8989-0585

BBS/Mailbox	+49-89-8989-0576 (analog)

BBS/Mailbox	+49-89-8989-0234 (ISDN)

CompuServe:

GO HERCULES

Internet

World Wide Web	www.hercules.com

FTP	ftp.hercules.com

E-Mail	support@hercules.com

sales@hercules.com

Wir bieten auch einen Hercules Information Server an. Abonnenten erhalten automatisch Benachrichtigungen über neue Treiberupdates und neue Software für die jeweiligen Produkte, die sie besitzen.


Der Hercules Information Server

Wenn Sie eine Internet E-Mail Adresse besitzen, sind Sie herzlich eingeladen, Abonnent des Hercules Information Servers zu werden. Sie erhalten dann automatisch eine Nachricht, wenn es neue Treiber und/oder Dienstprogramme für Ihre Hercules Grafikkarte gibt, oder wenn es andere wichtige Hinweise gibt. Dieser Service ist kostenlos mit Ausnahme der Kosten, die Ihnen Ihr Online Anbieter für die Zeit berechnet, in der Sie Ihre Nachrichten lesen.

Es gibt sechs Mailing-Listen

Die dynamite Liste ist für Besitzer einer Hercules Dynamite, Dynamite Pro, und Dynamite Power.

Die dyn128 Liste ist für Besitzer einer Hercules Dynamite 128/Video.

Die graphite Liste für Besitzer von Produkten aus der original Graphite Serie.

(Das sind die Produkte mit dem IIT AGX Chipsatz).

Die stingray Liste für Besitzer von Produkten aus der Stingray Serie.

Die term3d Liste ist für Besitzer einer Hercules Terminator 64/3D.

Die terminator Liste ist für Besitzer aller Hercules Terminator Produkte.

So abonnieren Sie

Um zu abonnieren senden Sie ein E-Mail über Internet an die folgende Adresse:

update@hercules.com

mit dem folgenden Text:

subscribe [Listen Name] Ihr Name

Wenn Sie z. B. Hans Mustermann heißen und eine Terminator 64/Video besitzen, dann würde Ihr „Abonnement“ wie folgt aussehen:

To: update@hercules.com

Subject:  [das können Sie leer lassen]

subscribe terminator Hans Mustermann

So erhalten Sie keine Benachrichtigungen mehr:

Senden Sie uns eine Nachricht an die Adresse update@hercules.com mit dem Wort „unsubscribe“ gefolgt mit dem Listen Namen als Nachrichtentext, z. B.:

To: update@hercules.com

Subject:  [das können Sie leer lassen]

unsubscribe terminator


Der Bildfrequenz Zähler

Der Hercules Bildfrequenz Zähler zeigt Ihnen die aktuelle Bildfrequenz bis 200 Hz an. Dies ist besonders im Zusammenhang mit der Bildjustage sinnvoll, um die Bildfrequenz zu überprüfen.

Höhere Bildfrequenzen bedeuten allgemein flimmerfreiere und kontrastreichere Darstellung auf einem weißeren Bildschirm. Das erleichtert das Arbeiten am Bildschirm, insbesondere dann, wenn Sie längere Zeit vor Ihrem Monitor sitzen müssen.

Klicken Sie auf die „SCHNELL“ Schaltfläche, um einen nahezu exakten Wert Ihrer Bildfrequenz zu messen. Klicken Sie auf die „GENAU“ Schaltfläche, um einen präzisen Wert zu erhalten.

Die Messung der Bildfrequenz mit „SCHNELL“ ist bis auf etwa 2 Hz genau und dauert nur 3 bis 5 Sekunden. Um einen präziseren Wert mit „GENAU“ zu messen, werden ca. 30 bis 40 Sekunden benötigt.

Hinweis: Wenn Sie Ihren Monitor im interlaced Modus betreiben (Zeilensprungverfahren), wird der Bildfrequenz Zähler einen Wert um 87 Hz anzeigen. Technisch ist diese Angabe zwar korrekt, sie ist aber dennoch irreführend. Denn im interlaced Modus werden 87 Halbbilder (abwechselnd gerade und ungerade Bildschirmzeilen) pro Sekunde am Bildschirm aufgebaut. Da der Bildschirm bei diesem Verfahren 2 mal aufgebaut werden muß, um ein vollständiges Bild darzustellen, reduziert sich die effektive Bildfrequenz um die Hälfte, also auf 43,5 Hz.


Bildjustage

Mit diesem Dienstprogramm können Sie Bildlage und Bildgröße auf Ihrem Monitor einstellen. Dadurch kann Ihr Monitor z. B. mit der gesamten Bildschirmfläche bei größt möglicher Bildfrequenz genutzt werden. Die Parameter der von Ihnen vorgenommenen Einstellungen werden für jede Kombination von Auflösung/Farbtiefe/Bildausschnitt auf Ihrer Festplatte gespeichert.

Die Schaltflächen in der Bildjustage Dialogbox haben folgende Funktion:

Bild vertikal vergrößern

Bild nach oben bewegen

Bild vertikal verkleinern

Bild nach unten bewegen

Bild nach links bewegen

Bild horizontal vergrößern

Bild nach rechts bewegen

Bild horizontal verkleinern

Während Sie den Bildschirm justieren, können Sie durch Anklicken von „Undo“ oder mit „U“, oder „Alt-U“ auf Ihrer Tastatur den letzen Änderungsschritt rückgängig machen. Das ist insbesondere dann sehr hilfreich, wenn Ihr Bildschirm durch zu hohe Frequenzen dunkel oder unlesbar wird.

Um die Monitor-Ansteuerung in den Zustand vor der Bildjustage zu versetzen, klicken Sie mit der Maus auf die „RESET“ Schaltfläche, oder drücken Sie die Tasten R oder Alt-R.

Wenn Sie mit „OK“ oder „Übernehmen“ bestätigen, werden Ihre Änderungen auf der Festplatte gesichert. Bei jedem erneuten Start von Windows 95 werden Ihre Einstellungen automatisch verwendet. Die Bildjustage ist für jede von Ihnen verwendete Kombination von Auflösung/Farbtiefe/Bildausschnitt nur einmal durchzuführen.

Wenn Sie jedoch die Wahl Ihres Monitors oder die Bildfrequenz mit der Eigenschaften für Anzeige Dialogbox von Windows 95 verändern, dann müssen Sie einige oder alle Kombinationen von Auflösung/Farbtiefe/Bildausschnitt erneut justieren.

Zwei weitere wichtige Hinweise zur Bildjustage:

•	Dieses Dienstprogramm modifiziert die Register Ihrer Grafikkarte. Es kann jedoch nicht erkennen, welchen Monitor Sie mit Ihrer Grafikkarte betreiben. Wenn Sie mit Ihrer Bildjustage erfolglos sein sollten, das dargestellte Bild immer noch zu breit ist und nicht auf den sichtbaren Bereich Ihres Bildschirms paßt, oder das Programm beim Einsatz ein starkes Flimmern auf Ihrem Bildschirm verursacht, dann versuchen Sie bitte das Bild am Ihrem Bildschirm einzustellen. Es könnte auch sein, daß Sie bei der Windows 95 Installation einen Bildschirm ausgewählt haben, der nicht mit den technischen Daten Ihres Monitors übereinstimmt. In nahezu allen Fällen ist jedoch eine sehr präzise Einstellung Ihres Bildschirms durch die Wahl des richtigen Monitors unter Windows 95, mit der hier beschriebenen Bildjustage und den Einstellungen an Ihrem Bildschirm möglich. Sollte das dennoch nicht funktionieren, dann installieren Sie bitte einen Bildschirmtypen unter Windows 95 dessen technische Daten unterhalb der Spezifikationen Ihres Bildschirms liegen.

•	Wenn Sie das Bild auf dem Monitor horizontal vergrößern, dann erhöhen Sie in den meisten Fällen auch die Bildfrequenz. Sie können die Bildfrequenz dadurch optimieren, indem Sie das Bild auf dem Monitor mit der Bildjustage horizontal vergrößern und mit den Bedienelementen an Ihrem Monitor verkleinern und zentrieren.


 Speedy

Mit den Funktionen dieser Karteikarte starten Sie Speedy, einen der härtesten Multitasking Bechmarks für Grafikkarten.

Klicken Sie mit der Maus auf „Go!“ oder auf Ihrer Tastatur auf „F2“, um Speedy zu starten. Speedy ist ein Multitasking Benchmarktest, der 9 Fenster gleichzeitig öffnet und sowohl Ihren PC als auch Ihre Hercules Grafikkarte stark belastet. Speedy durchläuft die gesamte Farbpalette und alle Rasteroperationen von Windows 95. Die Form der dargestellten Vielecke ist rein zufällig und Fehler von Treibern sind durch Fehldarstellungen häufig sehr leicht erkennbar. Durch die Vielzahl der gleichzeitig und zufällig ablaufenden Operationen kann ein repräsentativer Mittelwert der Performance Ihrer Grafikkarte berechnet werden. Im mittleren Fenster wird der SPEEDMARK angezeigt. Hierzu wird ein Mittelwert der Performance aus 60 Meßwerten zwischen der 11. und 70. Sekunde berechnet. Sie können Speedy verlassen, indem Sie die Taste F10 drücken.

Zu Speedy gehört eine eigene Dokumentation. Klicken Sie hierfür auf die „Hilfe“ Schaltfläche auf der Speedy Karteikarte, oder drücken Sie die Taste F1 während Speedy testet.


Bildfrequenz

Die Bildfrequenz ist die Anzahl der Bilder, die pro Sekunde auf Ihrem Bildschirm dargestellt werden. Eine Bildfrequenz von 75 Hz bedeutet, daß Ihr Bildschirm 75 mal pro Sekunde vom Elektronenstrahl beschrieben wird. (Hz ist die Abkürzung von „Hertz“ und bedeutet „mal pro Sekunde“. Dieser Begriff ist nach Heinrich Hertz, einem deutschen Physiker benannt.)

Je höher die Bildfrequenz ist, desto flimmerfreier und kontrastreicher ist die Darstellung. Häufig wird davon ausgegangen, daß 75 Hz für jeden Bildschirm-Anwender „flimmerfrei“ sind. Flimmerfrei ist jedoch individuell zu betrachten und hängt zusätzlich von Ihrem Monitor ab. Für einige Personen sind 60 Hz bereits flimmerfrei. Für etwa 50% der Bevölkerung sind 75 Hz flimmerfrei, und für etwa 95% der Bevölkerung sind erst 90 Hz flimmerfrei.

Bei einem schnell abklingenden Bildschirm tritt das Flimmern eher auf, als bei einem langsam abklingenden Bildschirm. Ein schnell abklingender Bildschirm ist jedoch häufig „weißer“ und ist deshalb bei höheren Bildfrequenzen ergonomischer. Sie müssen deshalb selbst ausprobieren welche Bildfrequenz für Sie persönlich ergonomisch ist. Ihre Hercules Grafikkarte kann je nach Modell Bildfrequenzen bis 90 Hz, 120 Hz oder sogar 150 Hz darstellen. Sollte eine höhere Auflösung flimmern, so empfehlen wir eine geringere Auflösung mit höherer Bildfrequenz.


Eigenschaften von Anzeige

Dieses Dienstprogramm gehört zu Windows 95, und ermöglicht Ihnen die Eigenschaften Ihrer Anzeige zu verändern. Hierzu gehören z. B. Farbtiefe und  Auflösung. Am einfachsten gelangt man zu „Eigenschaften von Anzeige“ indem man auf dem Desktop die rechte Maustaste drückt und „Eigenschaften“ auswählt. Sie können die Dialogbox auch mit „Anzeige“ in der Systemsteuerung starten.


Farbtiefe

Die Farbtiefe bezeichnet die Anzahl der möglichen Farben für jeden Bildpunkt auf Ihrem Bildschirm. Mögliche Farbtiefen sind 16 Farben (4 Bit), 256 Farben (8 Bit), High Color (32768 Farben (15 Bit) oder 65536 Farben (16 Bit) oder True Color (16,7 Millionen Farben (24 Bit oder 32 Bit)).

Farbtiefe ist eine Funktion der Karteikarte Konfigurieren der Anzeige von Hercules Touch 95.


Auflösung

Mit Auflösung werden die Anzahl der Bildpunkte der gesamten Darstellung bezeichnet. Entspricht die Auflösung auch Ihrem Bildausschnitt auf dem Monitor, so bezeichnet die Auflösung auch die Anzahl der Bildpunkte auf Ihrem Monitor. Zur Auswahl stehen allgemein 640x460 Bildpunkte, 800x600, 1024x768, 1280x1024 und 1600x1200. Aufgrund der Geometrie Ihres Monitors stehen die horizontalen und vertikalen Bildpunkte immer im Verhältnis 4:3 zueinander.

Häufig entspricht die Auflösung auch dem Bildausschnitt. Mit Ihrer Hercules Grafikkarte können Sie jedoch auch nur einen kleineren Bildausschnitt Ihrer gesamten Auflösung auf dem Monitor darstellen (Viewport/Virtual Desktop). Diese Funktion können Sie auf der Karteikarte Konfigurieren der Anzeige von Hercules Touch 95 aktivieren. Nähere Informationen finden Sie unter Einstellen von Auflösung und Bildausschnitt.


Font Size
Schriftart

Diese Funktion definiert die von Windows 95 verwendete Schriftart und Größe (Font), z. B. die Bezeichnungen unter den Icons sowie die Titel von Fenstern und Dialogboxen. Die Schriftgröße beeinflußt auch die Höhe der Applikations-Menüs. Größere Schriften sind besser lesbar, schränken jedoch die nutzbare Fläche auf dem Bildschirm ein, die z. B. für Spreadsheet oder Textverarbeitung zur Verfügung stehen. Kleinere Schriften sind insbesondere bei höheren Auflösungen schlechter lesbar.


Bildausschnitt

„Bildausschnitt“ bezeichnet den sichtbaren Teil der Auflösung auf Ihrem Monitor. So kann die Auflösung z. B. 1280x1024 Bildpunkte betragen, es werden auf Ihrem Monitor jedoch nur 800x600 Bildpunkte dargestellt (Virtual Desktop). Auf diese Art kann z. B. auch mit preiswerteren Monitoren mit einer Auflösung von 1280x1024 Bildpunkten gearbeitet werden, obwohl z. B. nur 1024x768, 800x600 oder 640x480 Bildpunkte, also ein Bildausschnitt, dargestellt werden. Allgemein sind auch die maximalen Bildfrequenzen bei einem Bildausschnitt höher, als bei einer hohen Auflösung. Sobald der Mauscursor in den Randbereich Ihres Monitors gelangt, wird der Bildausschnitt über die Auflösung verschoben (Panning). Mit Pan Lock kann der Ausschnitt fixiert werden.


OK

Mit „OK“ übernehmen Sie Ihre Einstellungen und verlassen Hercules Touch 95. Mit „Anwenden“ werden die Einstellungen ebenfalls übernommen, ohne Hercules Touch 95 zu verlassen.


Abbrechen

Mit „Abbrechen“ verlassen Sie Hercules Touch 95, ohne daß Ihre Änderungen übernommen werden.


Anwenden

Mit „Anwenden“ werden Ihre Einstellungen übernommen, ohne Hercules Touch 95 zu verlassen. Mit „OK“ übernehmen Sie Ihre Einstellungen und verlassen jedoch Hercules Touch 95.


Hilfe

Wenn Sie „Hilfe“ anklicken, dann öffnen Sie ein Fenster mir der Bedienungsanleitung für Hercules Touch 95. Ihnen wird zunächst ein Inhaltsverzeichnis angezeigt, das Sie jedoch auch ansehen können, wenn Sie mit der Maus auf Inhalt klicken.